\hypertarget{group__debug__flow__options}{}\section{Debug Flow Constants}
\label{group__debug__flow__options}\index{Debug Flow Constants@{Debug Flow Constants}}
\subsection*{Variables}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{group__debug__flow__options_gafc951fa946a7551e02bceeee1aa10ef1}\label{group__debug__flow__options_gafc951fa946a7551e02bceeee1aa10ef1}} 
const \hyperlink{group__debug__flow__options_gafc951fa946a7551e02bceeee1aa10ef1}{Qore\+::\+Debug\+Flow\+Break} = R\+C\+\_\+\+B\+R\+E\+AK
\begin{DoxyCompactList}\small\item\em force \hyperlink{statements_break}{break Statements} command \end{DoxyCompactList}\item 
\mbox{\Hypertarget{group__debug__flow__options_gaf5b5e4f7fd484abfe263530e602b7570}\label{group__debug__flow__options_gaf5b5e4f7fd484abfe263530e602b7570}} 
const \hyperlink{group__debug__flow__options_gaf5b5e4f7fd484abfe263530e602b7570}{Qore\+::\+Debug\+Flow\+Continue} = R\+C\+\_\+\+C\+O\+N\+T\+I\+N\+UE
\begin{DoxyCompactList}\small\item\em force \hyperlink{statements_continue}{continue Statements} command \end{DoxyCompactList}\item 
\mbox{\Hypertarget{group__debug__flow__options_ga6a06fcd79ab3e84ca2abfa8d87356ccd}\label{group__debug__flow__options_ga6a06fcd79ab3e84ca2abfa8d87356ccd}} 
const \hyperlink{group__debug__flow__options_ga6a06fcd79ab3e84ca2abfa8d87356ccd}{Qore\+::\+Debug\+Flow\+Return} = R\+C\+\_\+\+R\+E\+T\+U\+RN
\begin{DoxyCompactList}\small\item\em force \hyperlink{statements_return}{return Statements} command \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
These are the possible values that are passed back to program to change flow, i.\+e. exit loops or function from debugger

\begin{DoxySince}{Since}
Qore 0.\+8.\+13 
\end{DoxySince}
