\doxysection{Terminal Attributes Terminal Setting Constants}
\hypertarget{group__tattr__term__setting__constants}{}\label{group__tattr__term__setting__constants}\index{Terminal Attributes Terminal Setting Constants@{Terminal Attributes Terminal Setting Constants}}
\doxysubsubsection*{Variables}
\begin{DoxyCompactItemize}
\item 
\Hypertarget{group__tattr__term__setting__constants_ga9d4186bd3d8efad89a2d5ef9a1bdac32}\label{group__tattr__term__setting__constants_ga9d4186bd3d8efad89a2d5ef9a1bdac32} 
\mbox{\hyperlink{group__type__conversion__functions_ga9a401e5112c58f63c05e7ee1e15968ef}{const}} {\bfseries Qore\+::\+TCSADRAIN} = TCSADRAIN
\begin{DoxyCompactList}\small\item\em drain output, then change \end{DoxyCompactList}\item 
\Hypertarget{group__tattr__term__setting__constants_gacd2d752948b9057a27b85af7cea541e0}\label{group__tattr__term__setting__constants_gacd2d752948b9057a27b85af7cea541e0} 
\mbox{\hyperlink{group__type__conversion__functions_ga9a401e5112c58f63c05e7ee1e15968ef}{const}} {\bfseries Qore\+::\+TCSAFLUSH} = TCSAFLUSH
\begin{DoxyCompactList}\small\item\em drain output, flush input \end{DoxyCompactList}\item 
\Hypertarget{group__tattr__term__setting__constants_ga1e9c9ecc5ab9180c3665ba2115c792a0}\label{group__tattr__term__setting__constants_ga1e9c9ecc5ab9180c3665ba2115c792a0} 
\mbox{\hyperlink{group__type__conversion__functions_ga9a401e5112c58f63c05e7ee1e15968ef}{const}} {\bfseries Qore\+::\+TCSANOW} = TCSANOW
\begin{DoxyCompactList}\small\item\em make change immediate \end{DoxyCompactList}\item 
\Hypertarget{group__tattr__term__setting__constants_ga4c49895599ee5a5dcb84d600e17559d2}\label{group__tattr__term__setting__constants_ga4c49895599ee5a5dcb84d600e17559d2} 
\mbox{\hyperlink{group__type__conversion__functions_ga9a401e5112c58f63c05e7ee1e15968ef}{const}} {\bfseries Qore\+::\+TCSASOFT} = TCSASOFT
\begin{DoxyCompactList}\small\item\em flag -\/ don\textquotesingle{}t alter hardware state \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
If any of the constants in this group is not defined on the host system, then it will be assigned to 0 in \doxylink{namespace_qore}{Qore}. 