\hypertarget{group__tattr__term__setting__constants}{}\section{Terminal Attributes Terminal Setting Constants}
\label{group__tattr__term__setting__constants}\index{Terminal Attributes Terminal Setting Constants@{Terminal Attributes Terminal Setting Constants}}
\subsection*{Variables}
\begin{DoxyCompactItemize}
\item 
\hypertarget{group__tattr__term__setting__constants_ga9d4186bd3d8efad89a2d5ef9a1bdac32}{}const \hyperlink{group__tattr__term__setting__constants_ga9d4186bd3d8efad89a2d5ef9a1bdac32}{Qore\+::\+T\+C\+S\+A\+D\+R\+A\+I\+N} = T\+C\+S\+A\+D\+R\+A\+I\+N\label{group__tattr__term__setting__constants_ga9d4186bd3d8efad89a2d5ef9a1bdac32}

\begin{DoxyCompactList}\small\item\em drain output, then change \end{DoxyCompactList}\item 
\hypertarget{group__tattr__term__setting__constants_gacd2d752948b9057a27b85af7cea541e0}{}const \hyperlink{group__tattr__term__setting__constants_gacd2d752948b9057a27b85af7cea541e0}{Qore\+::\+T\+C\+S\+A\+F\+L\+U\+S\+H} = T\+C\+S\+A\+F\+L\+U\+S\+H\label{group__tattr__term__setting__constants_gacd2d752948b9057a27b85af7cea541e0}

\begin{DoxyCompactList}\small\item\em drain output, flush input \end{DoxyCompactList}\item 
\hypertarget{group__tattr__term__setting__constants_ga1e9c9ecc5ab9180c3665ba2115c792a0}{}const \hyperlink{group__tattr__term__setting__constants_ga1e9c9ecc5ab9180c3665ba2115c792a0}{Qore\+::\+T\+C\+S\+A\+N\+O\+W} = T\+C\+S\+A\+N\+O\+W\label{group__tattr__term__setting__constants_ga1e9c9ecc5ab9180c3665ba2115c792a0}

\begin{DoxyCompactList}\small\item\em make change immediate \end{DoxyCompactList}\item 
\hypertarget{group__tattr__term__setting__constants_ga4c49895599ee5a5dcb84d600e17559d2}{}const \hyperlink{group__tattr__term__setting__constants_ga4c49895599ee5a5dcb84d600e17559d2}{Qore\+::\+T\+C\+S\+A\+S\+O\+F\+T} = T\+C\+S\+A\+S\+O\+F\+T\label{group__tattr__term__setting__constants_ga4c49895599ee5a5dcb84d600e17559d2}

\begin{DoxyCompactList}\small\item\em flag -\/ don't alter hardware state \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
If any of the constants in this group is not defined on the host system, then it will be assigned to 0 in \hyperlink{namespace_qore}{Qore}. 
