
\begin{DoxyRefList}
\item[\label{bug__bug000006}%
\hypertarget{bug__bug000006}{}%
Module \hyperlink{group__date__and__time__functions}{date\+\_\+and\+\_\+time\+\_\+functions} ]the {\ttfamily \char`\"{}u\char`\"{}} and {\ttfamily \char`\"{}uu\char`\"{}} format codes work with milliseconds and not microseconds since they were implemented before qore supported microsecond time resolution; this cannot be changed without breaking backwards-\/compatibility

currently only English month abbreviations are accepted in the date/time mask  
\item[\label{bug__bug000008}%
\hypertarget{bug__bug000008}{}%
Member \hyperlink{group__date__and__time__functions_gad5572fcb49964bfe3005e144da579361}{Qore\+:\+:format\+\_\+date} (string format, date dt)]there is no locale support; day and month names and abbreviations are only returned in English  
\item[\label{bug__bug000002}%
\hypertarget{bug__bug000002}{}%
Member \hyperlink{group__filesystem__functions_gaf04a8a04f9130664f938cf7dc10dbaed}{Qore\+:\+:is\+\_\+readable} (string path)]on Windows this function always returns \hyperlink{group__boolean__constants_ga3ba2df91713a6249449347131ea526c3}{True} for directories; this will be fixed in a later version of \hyperlink{namespace_qore}{Qore}  
\item[\label{bug__bug000003}%
\hypertarget{bug__bug000003}{}%
Member \hyperlink{group__filesystem__functions_ga1f94b219bfc67a292a80cafcd2416ee5}{Qore\+:\+:is\+\_\+writable} (string path)]on Windows this function always returns \hyperlink{group__boolean__constants_ga9da2b9a8003cd3788e48305f8a00540f}{False} for directories; this will be fixed in a later version of \hyperlink{namespace_qore}{Qore}  
\item[\label{bug__bug000005}%
\hypertarget{bug__bug000005}{}%
Member \hyperlink{group__string__functions_ga4964d4d76f0418b0cf6af8898f04dce2}{Qore\+:\+:trim} (reference str, \+\_\+\+\_\+7\+\_\+ string chars)]it is not possible to trim multi-\/byte characters from strings using this function; each byte is treated as a character. No encoding conversions are done even if the {\itshape chars} argument has a different \hyperlink{character_encoding}{character encoding} than the {\itshape str} argument.  
\item[\label{bug__bug000004}%
\hypertarget{bug__bug000004}{}%
Member \hyperlink{group__string__functions_gae8d314e819a299d46d181696600d4293}{Qore\+:\+:trim} (string str, \+\_\+\+\_\+7\+\_\+ string chars)]it is not possible to trim multi-\/byte characters from strings using this function; each byte is treated as a character. No encoding conversions are done even if the {\itshape chars} argument has a different \hyperlink{character_encoding}{character encoding} than the {\itshape str} argument.  
\item[\label{bug__bug000001}%
\hypertarget{bug__bug000001}{}%
Member \hyperlink{class_qore_1_1zzz8datezzz9_aeff0dd69a9ef8f228b54ba5543b2e3c6}{Qore\+:\+:zzz8datezzz9\+:\+:format} (string format)]there is no locale support; day and month names and abbreviations are only returned in English 
\item[\label{bug__bug000009}%
\hypertarget{bug__bug000009}{}%
Page \hyperlink{signal_handling}{Signal Handling} ]it seems that \hyperlink{group__signal__constants_gaa481ec3f81e7c5d8009706eedea394ff}{S\+I\+G\+W\+I\+N\+C\+H} and \hyperlink{group__signal__constants_gaa64b81edb492442c84993c3e2d60999a}{S\+I\+G\+I\+N\+F\+O} cannot be handled on Darwin in Qore's dedicated signal-\/handling thread; the signals are never delivered to Qore's signal handling thread for some reason despite setting the internal signal masks appropriately. These signals can be handled normally in the main thread on Darwin (in other programs using traditional non-\/threading signal A\+P\+Is), but do not work with Qore (on Darwin only when using the pthread\+\_\+sigmask() and a dedicated signal-\/handling thread), possibly due to a bug related to signal handling and threading on Darwin. 
\end{DoxyRefList}
